---
title: Web
description: Dashboard xterm.js terminal. Cross-platform. The only option on Windows.
---

<div style={{ display: "flex", alignItems: "center", gap: "0.75rem", margin: "0.5rem 0 1.25rem" }}>
  <Logo name="web" size={28} />
  <span style={{ fontSize: "0.8125rem", color: "var(--color-fd-muted-foreground)" }}>Slot: <code>terminal</code> · Name: <code>web</code></span>
</div>

<PlatformSupport macos="full" linux="full" windows="full" />

The dashboard already has an xterm.js terminal connected to every session. The `web` plugin just points `ao open` at the right dashboard URL.

## Use

```yaml title="agent-orchestrator.yaml"
terminal: web
terminalConfig:
  dashboardUrl: http://localhost:3000     # default
```

| Config key | Default | What it does |
|---|---|---|
| `dashboardUrl` | `http://localhost:3000` | Base URL for the dashboard. Override when the dashboard runs on another host/port. |

## How it works

When you run `ao open <session>`, the plugin prints the session's dashboard URL. If you're on macOS/Linux, it also tries to open it in your default browser.

Since the terminal UI lives in the dashboard itself, there's no per-session state here — this plugin is just routing + convenience.

## Why this exists

- Windows has no `osascript` and no AppleScript-equivalent that's worth writing a plugin for.
- You're running AO on a remote host — no local terminal to attach to.
- You prefer browser tabs over terminal tabs.
